0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

-100 -50 0 50 100 150

Normalized Frequency (×π rad/sample)

Phase (degrees)

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 -40 -30 -20 -10 0

Normalized Frequency (×π rad/sample)

Magnitude (dB)