linear & 0.1 & 100 & 3 & 97.49 \\
linear & 1 & 45 & 0 & 97.85 \\
linear & 20 & 15 & 0 & 98.63 \\
poly (2) & 0.1 & 22 & 0 & 97.90 \\
poly (2) & 1 & 11 & 0 & 98.65 \\
poly (2) & 20 & 3 & 0 & 98.88 \\
poly (3) & 0.1 & 6 & 0 & 98.90 \\
poly (3) & 1 & 3 & 0 & 98.87 \\
poly (3) & 20 & 3 & 0 & 98.87 \\
poly (10) & 0.1 & 3 & 0 & 98.75 \\
poly (10) & 1 & 3 & 0 & 98.75 \\
poly (10) & 20 & 3 & 0 & 98.75 \\
RB ($\sigma = 1/2$) & 0.1 & 89 & 0 & 98.00 \\
RB ($\sigma = 1/2$) & 1 & 32 & 0 & 98.05 \\
RB ($\sigma = 1/2$) & 20 & 9 & 0 & 98.66 \\
RB ($\sigma = 1/10$) & 0.1 & 125 & 0 & 98.32 \\
RB ($\sigma = 1/10$) & 1 & 45 & 0 & 98.62 \\
RB ($\sigma = 1/10$) & 20 & 28 & 0 & 98.70 \\
RB ($\sigma = 1/50$) & 0.1 & 200 & 1 & 98.26 \\
RB ($\sigma = 1/50$) & 1 & 120 & 0 & 98.66 \\
RB ($\sigma = 1/50$) & 20 & 111 & 0 & 98.85 \\
